{
    "ltx_root": {
        "version": 4,
        "minor": 0,
        "ltx_data": [
            {
                "name": "EDA_PROBESET",
                "active": true,
                "debug_cores": [
                    {
                        "type": "XSDB_V3",
                        "name": "dbg_hub",
                        "spec": "labtools_xsdbm_v3",
                        "clk_input_freq_hz": "250000007"
                    },
                    {
                        "type": "ILA_V3",
                        "name": "i_qsfp1_capture_intfc/i_ila_3_qsfp1",
                        "spec": "labtools_ila_v6",
                        "ipName": "ila",
                        "core_location": {
                            "user_chain": 1,
                            "slave_index": 0,
                            "bscan_switch_index": 0
                        },
                        "uuid": "BA848F56547F5E8787AF559B8418877A",
                        "pins": [
                            {
                                "name": "probe0",
                                "id": 0,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 0,
                                "nets": [
                                    {
                                        "name": "i_qsfp1_capture_intfc/axis_dwidth_converter_512b_to_128b_tvalid_128",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe1",
                                "id": 1,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 1,
                                "nets": [
                                    {
                                        "name": "i_qsfp1_capture_intfc/qsfp1_tready_128b",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe2",
                                "id": 2,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 2,
                                "nets": [
                                    {
                                        "name": "i_qsfp1_capture_intfc/tx_fifo_128_prog_full",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe3",
                                "id": 3,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 3,
                                "nets": [
                                    {
                                        "name": "i_qsfp1_capture_intfc/tx_fifo_128_aempty",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe4",
                                "id": 4,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 4,
                                "nets": [
                                    {
                                        "name": "i_qsfp1_capture_intfc/tx_pre_buff_rdy_r",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe5",
                                "id": 5,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 5,
                                "nets": [
                                    {
                                        "name": "i_qsfp1_capture_intfc/tx_fifo_tvalid_128b_ena",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe6",
                                "id": 6,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 6,
                                "nets": [
                                    {
                                        "name": "i_qsfp1_capture_intfc/tx_fifo_tready_128b_ena",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe7",
                                "id": 7,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 7,
                                "nets": [
                                    {
                                        "name": "i_qsfp1_capture_intfc/tx_fifo_tready_128b_in",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe8",
                                "id": 8,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 8,
                                "nets": [
                                    {
                                        "name": "i_qsfp1_capture_intfc/qsfp1_almost_empty_512b_pipe",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe9",
                                "id": 9,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 9,
                                "nets": [
                                    {
                                        "name": "i_qsfp1_capture_intfc/qsfp1_tvalid_512b_pipe",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe10",
                                "id": 10,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 10,
                                "nets": [
                                    {
                                        "name": "i_qsfp1_capture_intfc/axis_dwidth_converter_512b_to_128b_tready",
                                        "isBus": false
                                    }
                                ]
                            }
                        ]
                    },
                    {
                        "type": "ILA_V3",
                        "name": "i_qsfp1_capture_intfc/i_ila_3_qsfp1_IN",
                        "spec": "labtools_ila_v6",
                        "ipName": "ila",
                        "core_location": {
                            "user_chain": 1,
                            "slave_index": 1,
                            "bscan_switch_index": 0
                        },
                        "uuid": "092C429E6E6257428E7DA1A1309B2E92",
                        "pins": [
                            {
                                "name": "probe0",
                                "id": 11,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 0,
                                "nets": [
                                    {
                                        "name": "i_qsfp1_capture_intfc/qsfp1_capture_tvalid_240b_in",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe1",
                                "id": 12,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 1,
                                "nets": [
                                    {
                                        "name": "i_qsfp1_capture_intfc/qsfp1_prog_full_240b",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe2",
                                "id": 13,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 2,
                                "nets": [
                                    {
                                        "name": "i_qsfp1_capture_intfc/qsfp1_afull_240b",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe3",
                                "id": 14,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 3,
                                "nets": [
                                    {
                                        "name": "i_qsfp1_capture_intfc/qsfp1_tvalid_512b",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe4",
                                "id": 15,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 4,
                                "nets": [
                                    {
                                        "name": "i_qsfp1_capture_intfc/qsfp1_tready_512b",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe5",
                                "id": 16,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 5,
                                "nets": [
                                    {
                                        "name": "i_qsfp1_capture_intfc/qsfp1_aempty_240b",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe6",
                                "id": 17,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 6,
                                "nets": [
                                    {
                                        "name": "i_qsfp1_capture_intfc/qsfp1_iq_240b_to_512b_overflow",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe7",
                                "id": 18,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 7,
                                "nets": [
                                    {
                                        "name": "i_qsfp1_capture_intfc/qsfp1_rx_data_ready",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe8",
                                "id": 19,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 8,
                                "nets": [
                                    {
                                        "name": "i_qsfp1_capture_intfc/<const0>_1",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe9",
                                "id": 20,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 9,
                                "nets": [
                                    {
                                        "name": "i_qsfp1_capture_intfc/<const0>_2",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe10",
                                "id": 21,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 10,
                                "nets": [
                                    {
                                        "name": "i_qsfp1_capture_intfc/<const0>",
                                        "isBus": false
                                    }
                                ]
                            }
                        ]
                    },
                    {
                        "type": "ILA_V3",
                        "name": "i_qsfp4_playback_intfc/i_ila_3_qsfp4_IN",
                        "spec": "labtools_ila_v6",
                        "ipName": "ila",
                        "core_location": {
                            "user_chain": 1,
                            "slave_index": 2,
                            "bscan_switch_index": 0
                        },
                        "uuid": "0643396FCC555106A132D31C950497E6",
                        "pins": [
                            {
                                "name": "probe0",
                                "id": 22,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 0,
                                "nets": [
                                    {
                                        "name": "i_qsfp4_playback_intfc/rx_tvalid_240b_pipe",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe1",
                                "id": 23,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 1,
                                "nets": [
                                    {
                                        "name": "i_qsfp4_playback_intfc/rx_tready_240b_pipe",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe2",
                                "id": 24,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 2,
                                "nets": [
                                    {
                                        "name": "i_qsfp4_playback_intfc/rx_tvalid_240b",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe3",
                                "id": 25,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 3,
                                "nets": [
                                    {
                                        "name": "i_qsfp4_playback_intfc/rx_tready_240b",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe4",
                                "id": 26,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 4,
                                "nets": [
                                    {
                                        "name": "i_qsfp4_playback_intfc/rx_tvalid_512b_pipe",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe5",
                                "id": 27,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 5,
                                "nets": [
                                    {
                                        "name": "i_qsfp4_playback_intfc/rx_tready_512b_pipe",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe6",
                                "id": 28,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 6,
                                "nets": [
                                    {
                                        "name": "i_qsfp4_playback_intfc/rx_tvalid_128b_pipe",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe7",
                                "id": 29,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 7,
                                "nets": [
                                    {
                                        "name": "i_qsfp4_playback_intfc/rx_tready_128b_pipe",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe8",
                                "id": 30,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 8,
                                "nets": [
                                    {
                                        "name": "i_qsfp4_playback_intfc/rx_tvalid_128b_en",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe9",
                                "id": 31,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 9,
                                "nets": [
                                    {
                                        "name": "i_qsfp4_playback_intfc/rx_tready_128b",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe10",
                                "id": 32,
                                "type": "DATA_TRIGGER",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 10,
                                "nets": [
                                    {
                                        "name": "i_qsfp4_playback_intfc/playback_data_path_enable_n_in",
                                        "isBus": false
                                    }
                                ]
                            }
                        ]
                    }
                ]
            }
        ]
    }
}